% ---------------------------------------------------
% Date:       12.12.2018
% Version:    v0.1
% Autor:      Felix Faltin <ffaltin91[at]gmail.com>
% Repository: https://github.com/faltfe/iodhbwm
% ---------------------------------------------------
% Use mainlanguage first
\section*{\abstractname}
    \thispagestyle{empty}
    \blindtext

% Switch language to english
\begin{otherlanguage}{english}
    \section*{\abstractname}
    \blindtext
    
\end{otherlanguage}

\cleardoublepage