\input epsf % dvips standard
\nopagenumbers

\lineskiplimit\maxdimen \lineskip5mm

\centerline{\epsffile{htchuse.100}}
\centerline{\epsffile{htchuse.101}}
\centerline{\epsffile{htchuse.102}}
\centerline{\epsffile{htchuse.103}}

\end
